<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% ======================================================================
% scrtime-en.tex
% Copyright (c) Markus Kohm, 2001-2022
%
% This file is part of the LaTeX2e KOMA-Script bundle.
%
% This work may be distributed and/or modified under the conditions of
% the LaTeX Project Public License, version 1.3c of the license.
% The latest version of this license is in
%   http://www.latex-project.org/lppl.txt
% and version 1.3c or later is part of all distributions of LaTeX 
% version 2005/12/01 or later and of this work.
%
% This work has the LPPL maintenance status "author-maintained".
%
% The Current Maintainer and author of this work is Markus Kohm.
%
% This work consists of all files listed in MANIFEST.md.
% ======================================================================
%
% Chapter about scrtime of the KOMA-Script guide
% Maintained by Markus Kohm
%
% ============================================================================

\KOMAProvidesFile{scrtime-en.tex}
                 [$Date: 2022-06-05 12:40:11 +0200 (So, 05. Jun 2022) $
                  KOMA-Script guide (chapter: scrtime)]
\translator{Markus Kohm\and Gernot Hassenpflug\and Karl Hagen}

\chapter{The Current Time with \Package{scrtime}}
\labelbase{scrtime}
\BeginIndexGroup
\BeginIndex{Package}{scrtime}

This package lets you find the current time. Starting with version~3.05, the
package also supports the option interface already familiar from the
\KOMAScript{} classes and various other \KOMAScript{} packages. See, for
example, \autoref{sec:typearea.options} for more information.

\begin{Declaration}%
  \Macro{thistime}\OParameter{delimiter}%
  \Macro{thistime*}\OParameter{delimiter}
\end{Declaration}%
\Macro{thistime} returns the current time\Index{time} in hours and minutes.
The delimiter between the values of hour, minutes and seconds can be given in
the optional argument. The default is the character ``\PValue{:}''.

\Macro{thistime*} works in almost the same way as \Macro{thistime}. The only
difference is that, unlike \Macro{thistime}, \Macro{thistime*} does not add a
leading zero to the minute field when its value is less than 10. Thus, with
\Macro{thistime} the minute field has always two places.
\begin{Example}
  The line
\begin{lstlisting}
  Your train departs at \thistime.
\end{lstlisting}
  results, for example, in:
  \begin{ShowOutput}
    Your train departs at \thistime.
  \end{ShowOutput}
  or:
  \begin{ShowOutput}
    Your train departs at 23:09.
  \end{ShowOutput}
  \bigskip
  In contrast to the previous example a line like:
\begin{lstlisting}
  This day is already \thistime*[\ hours and\ ] minutes old.
\end{lstlisting}
  results in:
  \begin{ShowOutput}
    This day is already \thistime*[\ hours and\ ] minutes old.
  \end{ShowOutput}
  or:
  \begin{ShowOutput}
    This day is already 12 hours and 25 minutes old.
  \end{ShowOutput}
\end{Example}
\EndIndexGroup


\begin{Declaration}%
 \Macro{settime}\Parameter{time}
\end{Declaration}%
\Macro{settime} sets the output of \DescRef{scrtime.cmd.thistime} and
\DescRef{scrtime.cmd.thistime*} to a fixed value. In this case, the optional
parameter of \DescRef{scrtime.cmd.thistime} or \DescRef{scrtime.cmd.thistime*}
is ignored, since the complete string returned by
\DescRef{scrtime.cmd.thistime} or \DescRef{scrtime.cmd.thistime*} has been
explicitly defined. \Macro{settime}.%
\EndIndexGroup


\begin{Declaration}
  \OptionVName{12h}{simple switch}%
\end{Declaration}%
\BeginIndex{Option}{24h}%
With the \Option{12h}\ChangedAt{v3.05a}{\Package{scrtime}} option, you can
select whether to print the time given by \DescRef{scrtime.cmd.thistime} and
\DescRef{scrtime.cmd.thistime*} in 12- or 24-hour format. The option accepts
the values for simple switches listed in \autoref{tab:truefalseswitch},
\autopageref{tab:truefalseswitch}. Using the option without a value is
equivalent to \OptionValue{12h}{true}, and therefore activates the
12-hour-format. The default, however, is \Option{24h}.

You can set this option globally in the optional argument of
\DescRef{typearea.cmd.documentclass}, as a package option in the optional
argument of \DescRef{typearea.cmd.usepackage}, or even after loading the
package using \DescRef{typearea.cmd.KOMAoptions} or
\DescRef{typearea.cmd.KOMAoption} (see, e.\,g. \autoref{sec:typearea.options},
\DescPageRef{typearea.cmd.KOMAoptions}). However the option no longer has any
effect on the if you call \DescRef{scrtime.cmd.settime}. After invoking this
command, the time is output only with the value and in the format specified
there.

For\textnote{Attention!} the sake of compatibility with earlier versions of
\Package{scrtime}, the option \Option{24h} will switch to 24-hour format if
used in the optional argument of \Macro{documentclass} or \Macro{usepackage}.
However, you should not use this option any longer.%
\EndIndexGroup
%
\EndIndexGroup

\endinput

%%% Local Variables: 
%%% mode: latex
%%% TeX-master: "scrguide-en.tex"
%%% coding: utf-8
%%% ispell-local-dictionary: "en_GB"
%%% eval: (flyspell-mode 1)
%%% End: 
</pre></body></html>